INPUT: propag.def

init_orbdet.
	.methods = Gauss Vaisala	
	.verbose = 2

fitobs.
	.prob_sampl=.false.
	.dmeacontr=0.2d0
! cobweb
	.cob_ndir=50     ! number of columns/directions (def. 100)
        .cob_np=50       ! number of rows/points in ray (def.100)
        .ndir_grid=100   ! number of columns/directions in the densified grid (def. 100)
        .np_grid=100     ! number of rows/points in ray in the densified grid (def.100)
        .cob_sigx=5.d0   ! sigma max in cobweb (def. 5.0)
        .cob_hmax=34.5d0 ! max absolute magnitude