! defaults for fitdebris
fitdeb.
! bizarre controls
        .ecclim=0.99d0    ! max eccentricity for non bizarre orbit 
        .samin=4.37d-5    ! min a for non bizarre orbit h=150 km 
        .samax=0.01d0     ! max a for non bizarre orbit: Hill's sphere 
        .phmin=4.25d-5    ! min q for non bizarre orbit: impact 
        .ahmax=0.02d0     ! max Q for non bizarre orbit 

INPUT: propag.def

init_orbdet.methods = Gauss Vaisala
init_orbdet.verbose = 2

